0 10 20 30 40 50

sub nv

0

0.05

0.1 =2.76 TeV NNs ALICE Pb-Pb ^±π c < 6 GeV/ Tp 0.3 <

centrality percentile

0 10 20 30 40 50

sub nv

0

0.05

0.1

sub 2v^{sub}_3v sub 4v^{sub}_5v ±K c < 4 GeV/ Tp 0.3 <

0 10 20 30 40 50 nv

0

0.05

0.1 pp+ c < 6 GeV/ Tp 0.4 <